1771984162344
1146,4.11.0
8176,0.0.0
9521,4.10.0
21828,0.0.0
22078,4.12.0
6196,0.0.0
15993,4.11.0
975,0.0.0
1867,0.0.0
5148,4.10.0
23887,0.0.0
