<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\chapter{Scientific and Technical Quality}\label{chap:quality}
\begin{todo}{from the proposal template}
  Maximum length for the whole of Section 1 â€“-- twenty pages, not including the tables in
  Section 1.3
\end{todo}

\input{objectives}
\input{progress}
\input{methodology}
%%% Local Variables: 
%%% mode: LaTeX
%%% TeX-master: "propB"
%%% End: 

</pre></body></html>